---
id: fmf-hooks
title: FMF Hook Reference
sidebar_label: FMF Hook Reference
description: Auto-generated from FrikaModFramework/fmf_hooks.json — run tools/fmf-hook-scanner.
---

:::info
This page is generated by `tools/fmf-hook-scanner`. Do not edit by hand.
:::

# FMF Hook Reference

## EMPLOYEE

### FMF.EMPLOYEE.Hired

**Description:** An employee was hired into the roster.

**Payload:**

- `employeeId` (string)
- `role` (string)

**Example (C#)**

```csharp
FmfApi.On("FMF.EMPLOYEE.Hired", payload => { });
```

## GAMEPLAY

### FMF.GAMEPLAY.JobCompleted

**Description:** Emitted when a job has been fully processed.

**Payload:**

- `jobId` (string)
- `durationSeconds` (number)
- `revenue` (number)

**Example (C#)**

```csharp
FmfApi.On("FMF.GAMEPLAY.JobCompleted", payload => { });
```

## PLAYER

### FMF.PLAYER.LevelUp

**Description:** Player progression level increased.

**Payload:**

- `newLevel` (number)
- `previousLevel` (number)

**Example (C#)**

```csharp
FmfApi.On("FMF.PLAYER.LevelUp", payload => { });
```

## RACK

### FMF.RACK.PowerLimitExceeded

**Description:** Power draw or allocation for a rack exceeded configured limits.

**Payload:**

- `rackId` (string)
- `watts` (number)

**Example (C#)**

```csharp
FmfApi.On("FMF.RACK.PowerLimitExceeded", payload => { });
```

## SERVER

### FMF.SERVER.RackOverheated

**Description:** Server rack exceeded a critical temperature threshold.

**Payload:**

- `rackId` (string)
- `temperature` (number)

**Example (C#)**

```csharp
FmfApi.On("FMF.SERVER.RackOverheated", payload => { });
```
